    There are 6 functions that use an image viewer mode. Each of $
these functions has it's own menu. Whenever you start an image   $
viewer function, or change an image viewer function, a message   $
will remind you that to get the menu for the function, hit       $
enter/left mouse button.  Each menu has 8 identical options:     $
$
    RETURN TO GRID - This option will return you to grid mode    $
    showing the same section of the image that was visible before$
    entering the image viewer mode.         $
$
    PRINT ENTIRE IMAGE - This option will chart the entire image $
    as you currently see it. As with the chart option on grid    $
    mode, you will be able to create either a PCX of the chart or$
    a hard copy of the chart. If you have changed the current    $
    size of the image, either by scaling or re-sizing, the new   $
    size will be printed exactly as you are viewing it.       $
$
    SCROLL IMAGE - If the dimensions of the image are greater    $
    than the screen resolution, you can scroll the image. Two    $
    scroll bars will appear, one down the right side of the      $
    image, and one across the bottom. Using the scroll bars you  $
    can change the section of the image that you are viewing.    $
$
     CHANGE TO SIZE FUNCTION                              $
     CHANGE TO SCALE FUNCTION                             $
     CHANGE TO PRINT FUNCTION                             $
     CHANGE TO LIBRARY FUNCTION                           $
     CHANGE TO EDIT FUNCTION                              $
     CHANGE TO VIEW FUNCTION - Each of these options will change $
     the menu you get when you hit enter. You will reminded to   $
     hit enter to get the menu, because physically the only      $
     change the screen may be the appearance, or disappearance of$
     the box. PRINT, LIBRARY, EDIT and VIEW use the symbol table $
     to perform their functions. Therefore if you change to these$
     modes and HAVE NOT saved the current image to the symbol    $
     table, you will be given the option to either save the      $
     current image, or restore the original image. You cannot    $
     PRINT, EDIT, INCORPORATE LIBRARY ELEMENTS, or VIEW a scaled $
     or re-sized image.$
